Injection Phase-space Tracking (Turns 0-9)

01/12/06 16.09

-Xp (mrad)

Turn 0 (Injection)

1σ 10σ

-Xp (mrad)

Turn 1

1σ 10σ

-Xp (mrad)

Turn 2

1σ 10σ

-Xp (mrad)

Turn 3

1σ 10σ

-Xp (mrad)

Turn 4

1σ 10σ

-Xp (mrad)

Turn 5

1σ 10σ

-Xp (mrad)

Turn 6

1σ 10σ

-Xp (mrad)

Turn 7

1σ 10σ

-X (mm)

-Xp (mrad)

Turn 8

1σ 10σ

-X (mm)

-Xp (mrad)

Turn 9

1σ 10σ

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-4 -2 0 2 4

-50 -25 0 25 50

0 2 4

-4 -2 0 2 4

-50 -25 0 25 50

0 2 4