First integral of B_Y (gauss-cm)

Single-Pole Warm Test^{03/11/18 14.00}

Z (cm)

Difference of First Integrals

Z (cm)

Single-pole test -- Main: 1 A Single-pole test -- Coil widened by 1.5 mm

-1500

-1000

-500 0 500 1000

1500

-15 -10 -5 0 5 10 15

-10 -5 0 5 10 15 20 25

-15 -10 -5 0 5 10 15