Z=-57.4 cm

Wiggler Field Comparison^{03/02/21 10.22}

X (cm)

B_Y/B^{max}_Y (y=z=0)

7-Pole Nr 2 8/8 model: Upper half rotated 0.48 deg -- Main: 144 A Trim 7.2 A Wiggler Nr 2 Hall Probe -- Main: 141 A Trim: 3.5 A

0.99

0.992

0.994

0.996

0.998

1

1.002

1.004

-4 -3 -2 -1 0 1 2 3 4