Central Pole^{02/04/29 17.21}

X (cm)

B_Y (y=z=0) (Tesla)

60 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

60 A

0.95 1 1.05 1.1 1.15 1.2 1.25

-3 -2 -1 0 1 2 3

0.997

0.998

0.999 1 1.001

1.002

1.003

-3 -2 -1 0 1 2 3

Central Pole^{02/04/29 17.21}

X (cm)

B_Y (y=z=0) (Tesla)

85 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

85 A

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65

-3 -2 -1 0 1 2 3

0.997

0.998

0.999 1 1.001

1.002

1.003

-3 -2 -1 0 1 2 3

Central Pole^{02/04/29 17.21}

X (cm)

B_Y (y=z=0) (Tesla)

110 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

110 A

1.55 1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2

-3 -2 -1 0 1 2 3

0.997

0.998

0.999 1 1.001

1.002

1.003

-3 -2 -1 0 1 2 3

Central Pole^{02/04/29 17.21}

X (cm)

B_Y (y=z=0) (Tesla)

135 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

135 A

1.75 1.8 1.85 1.9 1.95 2 2.05 2.1 2.15 2.2

-3 -2 -1 0 1 2 3

0.997

0.998

0.999 1 1.001

1.002

1.003

-3 -2 -1 0 1 2 3

Central Pole^{02/04/29 17.21}

X (cm)

B_Y (y=z=0) (Tesla)

161 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

161 A

2 2.1 2.2 2.3 2.4

-3 -2 -1 0 1 2 3

0.997

0.998

0.999 1 1.001

1.002

1.003

-3 -2 -1 0 1 2 3

Central Pole^{02/04/29 17.21}

X (cm)

B_Y (y=z=0) (Tesla)

185 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

185 A

2.1 2.2 2.3 2.4 2.5 2.6

-3 -2 -1 0 1 2 3

0.997

0.998

0.999 1 1.001

1.002

1.003

-3 -2 -1 0 1 2 3

Central Field Value

Central Pole^{02/04/29 17.21}

Current/Turn (A)

B_Y (x=y=z=0) (Tesla)

Vector Fields Calculation

Hall Probe Measurement

1

1.2

1.4

1.6

1.8

2

2.2

40 60 80 100 120 140 160 180 200

End Pole 1^{02/04/29 17.22}

X (cm)

B_Y (y=z=0) (Tesla)

60 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

60 A

0.65 0.7 0.75 0.8 0.85 0.9

-3 -2 -1 0 1 2 3

0.994

0.996

0.998

1

1.002

1.004

-3 -2 -1 0 1 2 3

End Pole 1^{02/04/29 17.22}

X (cm)

B_Y (y=z=0) (Tesla)

85 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

85 A

0.9 0.95 1 1.05 1.1 1.15 1.2

-3 -2 -1 0 1 2 3

0.994

0.996

0.998

1

1.002

1.004

-3 -2 -1 0 1 2 3

End Pole 1^{02/04/29 17.22}

X (cm)

B_Y (y=z=0) (Tesla)

110 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

110 A

1.1 1.15 1.2 1.25 1.3 1.35 1.4 1.45 1.5

-3 -2 -1 0 1 2 3

0.994

0.996

0.998

1

1.002

1.004

-3 -2 -1 0 1 2 3

End Pole 1^{02/04/29 17.22}

X (cm)

B_Y (y=z=0) (Tesla)

135 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

135 A

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65 1.7

-3 -2 -1 0 1 2 3

0.994

0.996

0.998

1

1.002

1.004

-3 -2 -1 0 1 2 3

End Pole 1^{02/04/29 17.22}

X (cm)

B_Y (y=z=0) (Tesla)

161 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

161 A

1.5 1.6 1.7 1.8 1.9

-3 -2 -1 0 1 2 3

0.994

0.996

0.998

1

1.002

1.004

-3 -2 -1 0 1 2 3

End Pole 1^{02/04/29 17.22}

X (cm)

B_Y (y=z=0) (Tesla)

185 A

X (cm)

B_Y/B^{max}_Y (y=z=0) (Tesla)

185 A

1.6 1.7 1.8 1.9 2 2.1

-3 -2 -1 0 1 2 3

0.994

0.996

0.998

1

1.002

1.004

-3 -2 -1 0 1 2 3

Central Field Value

End Pole 1^{02/04/29 17.22}

Current/Turn (A)

B_Y (x=y=z=0) (Tesla)

Vector Fields Calculation

Hall Probe Measurement

0.4

0.6

0.8

1

1.2

1.4

1.6

1.8

40 60 80 100 120 140 160 180 200