0 0.2 0.4 0.6 0.8 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

tan(θ_{in}) efficiency

Geometric efficiency Dipole field, Ein = 300eV Dipole field, Ein = 1eV