Hybrid Photoelectron Energy Distribution

10/10/06 13.45

Normalized Power Law

Normalized Gaussian

Normalized Sum of Power Law and Gaussian

0 0.001

0.002

0.003

0.004

0 50 100 150 200 250 300 350 400 450 500

0 0.025

0.05

0.075 0.1

0 50 100 150 200 250 300 350 400 450 500

0

0.005

0.01

0 50 100 150 200 250 300 350 400 450 500

10/10/06 13.45

Low-Energy Region (eV)

High-Energy Region (eV)

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1

0 10 20 30 40 50 60 70 80 90 100

10^{-5}

10^{-4}

10^{-3}

0 200 400 600 800 1000 1200 1400 1600 1800 2000