0 50 100 150 200

500

1000

1500

2000

2500

3000

retarding voltage (-V) collector no. 10 current (nA)

Quadrupole Comparison: 1x45x1mA e+, 5.3 GeV, 14ns

data 1 turn simulation 5 turn simulation 10 turn simulation 15 turn simulation 19 turn simulation