1.925 1.93 1.935 1.94 1.945 1.95 1.955 1.96 1.965 1.97 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Carrier Frequency (GHz)

Mean Center Energy Flux (arb)

Standing Wave Resonance Shift Due to e- Cloud

No e- 10^{14}/m^3 e-

2.05 MHz