Job 15475: Shielded Button Simulation

-8 -7 -6 -5 -4 -3 -2 -1 0

-10 0 10 20 30 40 50 60 70 80

11/09/20 13.31

Button Current (mA)

-8 -7 -6 -5 -4 -3 -2 -1 0

-10 0 10 20 30 40 50 60 70 80

Button Current (mA)