Bunch current dependence: 5.3 GeV 15W TiN e+

-1.6

-1.4

-1.2

-1

-0.8

-0.6

-0.4

-0.2

0

0 10 20 30 40 50 60 70 80 90 100

Time (ns)

Button Signal (V)

4/18/14 Trace 39 2 mA/bunch 4/18/14 Trace 49 4 mA/bunch 4/18/14 Trace 59 6 mA/bunch 4/18/14 Trace 69 8 mA/bunch