2085mev_20081107-positive_x_side_positron^{10/03/03 10.22}

Photons/m/Beam Particle Power (W/m) for 100 mA Beam Current

S(m)

Drift Dipole Other

-200 0 200 400 600 800 1000

1200

1400

0 100 200 300 400 500 600 700

0 250 500 750 1000

1250

1500

1750

2000 x 10^4

0 100 200 300 400 500 600 700