Element     Nr Seg   <Length>  Tot Length  Fraction     <Beta X>     <Beta Y>     <Sig X>     <Sig Y>     <Phot/m/e>
Dipole       47492    0.010      475.0       61.8%        14.1         18.6       0.717        0.030          0.554
Drift        18089    0.010      179.6       23.3%        16.1         17.7       0.817        0.028          0.280
Wiggler       2459    0.010       24.6        3.2%         7.2         16.4       0.280        0.028          0.697
Quadrupole    6635    0.010       66.3        8.6%        17.3         20.0       0.724        0.029          0.382
Sextupole     2193    0.010       21.9        2.9%        17.7         19.9       0.825        0.029          0.334
Solenoid         0    0.000        0.0        0.0%         0.0          0.0       0.000        0.000          0.000
Octupole       153    0.010        1.5        0.2%        24.6          7.6       0.878        0.019          0.072
Non-dipole   29529    0.010      293.9       38.2%        15.8         18.2       0.752        0.029          0.341
Non-drift    58932    0.010      589.5       76.6%        14.3         18.7       0.704        0.029          0.531
Total        77021    0.010      769.2      100.0%        14.7         18.4       0.730        0.029          0.472

Element    <F>=<Phot/m/e> Max(F) RMS(F) <Bx*F>/<Bx> Max(Bx*F/<Bx>) RMS(Bx*F/<Bx>) <By*F>/<By> Max(By*F/<By>) RMS(By*F/<By>)
Dipole         0.554     145.901  2.145     0.509      49.619         0.976          0.533     259.997         3.695
Drift          0.280      93.138  1.053     0.249      23.363         0.521          0.301     236.223         2.078
Wiggler        0.697      10.505  0.757     0.616      11.837         0.876          0.668      11.309         0.750
Quadrupole     0.382       2.644  0.363     0.355       3.034         0.464          0.357       2.672         0.406
Sextupole      0.334       2.061  0.265     0.328       2.204         0.367          0.314       2.061         0.289
Solenoid       0.000       0.000  0.000     0.000       0.000         0.000          0.000       0.000         0.000
Octupole       0.072       0.172  0.054     0.064       0.141         0.040          0.058       0.101         0.033
Non-dipole     0.341      93.138  0.880     0.294      23.837         0.510          0.343     229.553         1.609
Non-drift      0.531     145.901  1.938     0.480      48.779         0.892          0.508     258.779         3.308
Total          0.472     145.901  1.774     0.421      47.363         0.811          0.461     261.924         3.087