QSPU in Q48W: 5.3 GeV e+ 4.1 mA/bunch

-0.004

-0.003

-0.002

-0.001

0

0 50 100 150 200 250 300 350

Collector Signal (V)

a)

N_{bunch} = 6.55 Ξ 10^{10}

10 bunch train 0mA/bunch

20 bunch train 0mA/bunch

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 50 100 150 200 250 300 350

Collector Signal (V)

ECLOUD job 1

ECLOUD job 1