QSPU at Q15WA: 5.3 GeV e+ 20 bunches

Time (ns)

Collector Signal (V)

12/14/16 Trace 1 2.04 mA/bunch 12/14/16 Trace 9 2.98 mA/bunch 12/14/16 Trace 17 4.01 mA/bunch 12/14/16 Trace 25 4.99 mA/bunch 12/14/16 Trace 33 6.27 mA/bunch 12/14/16 Trace 41 7.34 mA/bunch 12/14/16 Trace 49 8.02 mA/bunch 12/14/16 Trace 57 8.58 mA/bunch

-0.04

-0.03

-0.02

-0.01

0

90 90.2 90.4 90.6 90.8 91 91.2 91.4 91.6 91.8 92