Job 0: Button Signal Macroparticles For 98 Λ T Λ 128 ns

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

100 105 110 115 120 125

11/04/26 11.29

No Arrival Energy Weight

Signal (V)

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

100 105 110 115 120 125 With Arrival Energy Weight Function

Signal (V)