TS20090201_SEY18_Epk310 (2D Averages): Electric Field and Gradients at X=Y=0

(E_X(+)+E_X(-))/2 (V/m)

(E_Y(+)+E_Y(-))/2 (V/m)

Time (ns) dE_X /dX (V/m^2)

Time (ns) dE_Y /dY (V/m^2)

-15 -12.5 -10 -7.5 -5 -2.5 0 2.5 5

0 200 400 600 -4 -3 -2 -1 0 1 2 3

0 200 400 600

-1.5

-1

-0.5

0

0.5

1

1.5

0 200 400 600

-5000

0

5000

10000

15000

20000

25000

0 200 400 600