TS20091110_23nm: Coherent Tune Shifts

Time (ns) Time (ns)

Drift Dipole Drift + Dipole Feb/2009 e+ Beam (2.1 GeV)

ΔQ_X (kHz) ΔQ_Y (kHz)

-2.5 -2 -1.5 -1 -0.5 0 0.5

0 200 400 600 -2 -1 0 1 2 3

0 200 400 600