synrad_job105_posx^{12/09/12 11.23}

0

1

2

3

4

5

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Photons/m/Beam Particle

Q48W

0 50 100 150 200 250 300 350 400

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380 S (m)

Power (W/m) for 100 mA Beam Current

Q48W

Drift Dipole Wiggler Other

synrad_job105_posx^{12/09/12 11.23}

2.326

2.328

2.33

2.332

2.334

2.336

2.338

2.34

2.342

2.344

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Critical Energy (keV)

Q48W

0

1

2

3

4

5

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380 S(m)

Photons/m/Beam Particle

Q48W

Drift Dipole Wiggler Other

synrad_job105_posx^{12/09/12 11.23}

14 16 18 20 22

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Beta X (m)

Q48W

3.5 4 4.5 5

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Beta Y (m)

Q48W

-0.01 0 0.01

0.02

0.03

0.04

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380 S(m)

Eta X (m)

Q48W

Drift Dipole Wiggler Other

synrad_job105_posx^{12/09/12 11.23}

1200

1250

1300

1350

1400

1450

1500

1550

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Horizontal Beam Size (μm)

Q48W

80 82.5 85 87.5 90 92.5 95 97.5 100 102.5 105

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380 S(m)

Vertical Beam Size (μm)

Q48W

Drift Dipole Wiggler Other

synrad_job105_posx^{12/09/12 11.23}

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Surface Power Density (W/mm^2)

Q48W

0 50 100 150 200 250 300 350 400

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380 S (m)

Linear Power Density (W/m)

Q48W

Drift Dipole Wiggler Other

synrad_job105_posx^{12/09/12 11.23}

0

1

2

3

4

5

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380

Photons/m/Beam Particle

Q48W

4 4.5 5 5.5 6 6.5 7

378 378.2 378.4 378.6 378.8 379 379.2 379.4 379.6 379.8 380 S (m)

Wall Position (cm)

Q48W

Drift Dipole Wiggler Other