Job 15252: Shielded Button Simulation

-6

-4

-2

0

0 5 10 15 20 25

10/04/12 13.58

Button Current (mA)

Button 1

-100 -75 -50 -25 0

0 5 10 15 20 25

Button Current (mA)

Button 2

-20 -15 -10 -5 0

0 5 10 15 20 25 Time (ns)

Button Current (mA)

Button 3