Hybrid Photoelectron Energy Distribution

10/07/14 11.35

Normalized Power Law

Normalized Gaussian

Normalized Sum of Power Law and Gaussian

0 0.001

0.002

0.003

0.004

0 50 100 150 200 250 300 350 400 450 500

0 0.025

0.05

0.075 0.1

0 50 100 150 200 250 300 350 400 450 500

0

0.005

0.01

0 50 100 150 200 250 300 350 400 450 500