Job 16591: Shielded Button Simulation

-0.1

-0.05

0

0 2 4 6 8 10 12 14

10/07/14 10.57

Button Current (mA)

Button 1

-0.2

-0.1

0

0 2 4 6 8 10 12 14

Button Current (mA)

Button 2

-0.1

-0.05

0

0 2 4 6 8 10 12 14 Time (ns)

Button Current (mA)

Button 3