15E (TiN) Shielded Button Measurements (3/16/2010, 5.3 GeV, 8 mA bunch)

10/07/14 10.57

-0.09

-0.08

-0.07

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Electron Beam

Signal (Volts)

-0.09

-0.08

-0.07

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Positron Beam

Signal (Volts)