Job 16591: Button Signal Energies For 0 Λ T Λ 14 ns

-1000

0

1000

2000

3000

4000

5000

6000

7000

8000

0 1000 2000 3000 4000 5000

10/07/14 10.57

Production Energy for Button 2 (eV)

Arrival Energy (eV)