δ_{red} Comparison: 5.3 GeV e+ 15W Al

-0.2

-0.15

-0.1

-0.05

0

0 20 40 60 80 100 120 140

Time (ns)

Button Signal (V)

δ_0 = 0.5 δ_{ts} = 1 δ_{red} = 0

δ_{red} Comparison: 5.3 GeV e+ 15W Al

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 20 40 60 80 100 120 140

Time (ns)

Button Signal (V)

δ_0 = 0.5 δ_{ts} = 0.9 δ_{red} = 0.1

δ_{red} Comparison: 5.3 GeV e+ 15W Al

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 20 40 60 80 100 120 140

Time (ns)

Button Signal (V)

δ_0 = 0.5 δ_{ts} = 0.8 δ_{red} = 0.2

δ_{red} Comparison: 5.3 GeV e+ 15W Al

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 20 40 60 80 100 120 140

Time (ns)

Button Signal (V)

δ_0 = 0.5 δ_{ts} = 0.7 δ_{red} = 0.3

δ_{red} Comparison: 5.3 GeV e+ 15W Al

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 20 40 60 80 100 120 140

Time (ns)

Button Signal (V)

δ_0 = 0.5 δ_{ts} = 0.6 δ_{red} = 0.4