Beampipe-averaged Cloud Density (10^{12} m^{-3})

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.1

0.2

0.3

0.4

0.5

0.6

0 500 1000 1500 2000 2500 3000

Macroparticle Statistics

Time (ns)

Number of Macroparticles (10^3)

0 25 50 75 100 125 150 175 200 225 250

0 500 1000 1500 2000 2500 3000

Beam-averaged Cloud Density (10^{12} m^{-3})

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.2

0.4

0.6

0.8

1

1.2

0 500 1000 1500 2000 2500 3000

5-Sigma Cloud Density at Center of Pipe (10^{12} m^{-3})

Time (ns)

Electron Density (m^{-3})

0

0.1

0.2

0.3

0.4

0.5

0.6

0 500 1000 1500 2000 2500 3000

ECLOUD-Quad_5.3GeV: Cloud Density in Central Grid Cell (10^{12} m^{-3})

Time (ns)

Electron Density (m^{-3})

0

0.05

0.1

0.15

0.2

0.25

0.3

0 500 1000 1500 2000 2500 3000