Positrons: Field Gradient dE_X /dX (V/m^2)

Bunch 1 Bunch 2

Bunch 3 Bunch 4

Bunch 5 Bunch 6

Bunch 7 Bunch 8

Time (ns)

Bunch 9

Time (ns)

Bunch 10

-40 -20 0

0 0.1 0.2 0.3

-140

-120

-100

14 14.1 14.2 14.3

-80

-60

28 28.1 28.2 28.3 -20 0 20

42 42.1 42.2 42.3

100

150

56 56.1 56.2 56.3 150 200 250

70 70.1 70.2 70.3

300 350 400

84 84.1 84.2 84.3 300 350 400

98 98.1 98.2 98.3

400

500

112 112.1 112.2 112.3 400 500

126 126.1 126.2 126.3