Bunch current dependence: 5.3 GeV Positrons

11/03/16 12.01

-2.25

-2

-1.75

-1.5

-1.25

-1

-0.75

-0.5

-0.25

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

9/21 Trace 109 15W TiN 1 mA 9/21 Trace 115 15W TiN 2 mA 9/21 Trace 121 15W TiN 4 mA 9/21 Trace 127 15W TiN 6 mA 9/21 Trace 133 15W TiN 8 mA 9/21 Trace 139 15W TiN 10 mA

Bunch current dependence: 5.3 GeV Positrons

11/03/16 12.02

-0.16

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 2 4 6 8 10 12 14 16 18 20

Time (ns)

Button Signal (V)

9/21 Trace 73 15W TiN 1 mA 9/21 Trace 79 15W TiN 2 mA 9/21 Trace 85 15W TiN 4 mA 9/21 Trace 91 15W TiN 6 mA 9/21 Trace 97 15W TiN 8 mA 9/21 Trace 103 15W TiN 10 mA