Job 20719: Primary Photoelectrons

Entries Mean RMS UDFLW OVFLW

9996 96.60 138.9 0.000 14.00

11/03/16 11.47

Entries Mean RMS UDFLW OVFLW

9996 83.31 101.0 0.000 215.0

Entries Mean RMS UDFLW OVFLW

9996 7.885 4.183 0.000 6804.

Energy (eV)

1000

2000

3000

0 200 400 600 800 1000 1200 1400

500

1000

0 50 100 150 200 250 300 350 400 450 500

100

200

0 2 4 6 8 10 12 14