Job 20711: Signal Energies and Azimuth For 0 Λ T Λ 14 ns

0

500

1000

0 100 200 300 400 500

Entries Mean RMS 10046 77.14 97.47

11/03/16 11.37

Production Energy for Button 1 (eV)

0 500 1000

1500

2000

0 50 100 150 200 250 300 350 400 450 500 Production Energy for Button 2 (eV)

0 100 200 300 400

0 100 200 300 400 500

Entries Mean RMS 4695 119.1 109.8

Production Energy for Button 3 (eV)