Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 0.3149E-01 0.2532E-01

08/06/13 12.55

X Distribution (cm)

Entries Mean RMS 40842 0.1784E-03 0.1879E-01

Y Distribution (cm)

Entries Mean RMS 40842 0.1977E-02 0.2890

Z Distribution (cm)

0

10000

20000

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

0 1000

2000

3000

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

0 250 500 750 1000

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 0.4380E+06 0.9271E+06

08/06/13 12.55

V_X Distribution (m/s)

Entries Mean RMS 40842 -9427.

0.1048E+07

V_Y Distribution (m/s)

Entries Mean RMS 40842 -3705.

0.9376E+06

V_Z Distribution (m/s)

0 2500

5000

7500

10000

-10000 -8000 -6000 -4000 -2000 0 2000 4000 6000 8000 10000 x 10^3

0

2000

4000

-10000 -8000 -6000 -4000 -2000 0 2000 4000 6000 x 10^3

0 500 1000

1500

-3000 -2000 -1000 0 1000 2000 3000 x 10^3

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 0.3462E-01 0.2335E-01

08/06/13 12.55

Charge-weighted X Distribution (cm)

Entries Mean RMS 40842 0.7038E-04 0.1556E-01

Charge-weighted Y Distribution (cm)

Entries Mean RMS 40842 0.1932E-02 0.2892

Charge-weighted Z Distribution (cm)

0 2000

4000

6000 x 10^6

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

0 2000

4000

6000

8000 x 10^5

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

0 500 1000

1500 x 10^5

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 0.3552E+06 0.6708E+06

08/06/13 12.55

Charge-weighted V_X Distribution (m/s)

Entries Mean RMS 40842 -0.1508E+05 0.9883E+06

Charge-weighted V_Y Distribution (m/s)

Entries Mean RMS 40842 -7464.

0.1043E+07

Charge-weighted V_Z Distribution (m/s)

0 500 1000

1500

2000 x 10^6

-10000 -8000 -6000 -4000 -2000 0 2000 4000 6000 8000 10000 x 10^3

0 2500

5000

7500

10000 x 10^5

-10000 -8000 -6000 -4000 -2000 0 2000 4000 6000 x 10^3

0 1000

2000

3000 x 10^5

-3000 -2000 -1000 0 1000 2000 3000 x 10^3

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 4.450 0.2635E-02

08/06/13 12.55

ρ Distribution (cm)

Entries Mean RMS 40842 178.9 156.7

ϕ Distribution (degrees)

0 500 1000

1500

2000

2500

3000

3500

4.442 4.444 4.446 4.448 4.45 4.452 4.454 4.456 4.458

0 2000

4000

6000

8000

10000

-50 0 50 100 150 200 250 300 350 400

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 4.450 0.2743E-02

08/06/13 12.55

Charge-weighted ρ Distribution (cm)

Entries Mean RMS 40842 178.9 162.7

Charge-weighted ϕ Distribution (degrees)

0 1000

2000

3000

4000

5000

6000

7000

8000 x 10^5

4.442 4.444 4.446 4.448 4.45 4.452 4.454 4.456 4.458

0

500

1000

1500

2000

2500 x 10^6

-50 0 50 100 150 200 250 300 350 400

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 0.1169E+07 0.8851E+06

08/06/13 12.55

V_ρ Distribution (m/s)

Entries Mean RMS 40842 180.9 126.5

V_ϕ Distribution (degrees)

0 1000

2000

3000

4000

5000

-200 0 200 400 600 800 1000 1200 x 10^4

0 200 400 600 800 1000

1200

1400

-50 0 50 100 150 200 250 300 350 400

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 0.9991E+06 0.7453E+06

08/06/13 12.55

Charge-weighted V_ρ Distribution (m/s)

Entries Mean RMS 40842 180.9 124.3

Charge-weighted V_ϕ Distribution (degrees)

0 2000

4000

6000

8000

10000 x 10^5

-200 0 200 400 600 800 1000 1200 x 10^4

0 500 1000

1500

2000

2500

3000 x 10^5

-50 0 50 100 150 200 250 300 350 400

Job 273: Electron Cloud Charges Lost at Wall

08/06/13 12.55

ENTRIES 40842 0.00 0.00 0.00 0.00 0.408E+05 0.00 0.00 0.00 0.00

X (cm)

Y(cm)

-5

-4

-3

-2

-1

0

1

2

3

4

5

-5 -4 -3 -2 -1 0 1 2 3 4 5

Job 273: Electron Cloud Charges Lost at Wall

Entries Mean RMS 40842 8.525 8.023

08/06/13 12.55

Kinetic Energy (eV) 0

2000

4000

6000

8000

10000

12000

14000

16000

18000

0 50 100 150 200 250 300 350

Job 273: Electron Cloud Charges Lost at Wall

08/06/13 12.55

ENTRIES 40842 0.00 0.00 0.00 0.00 0.408E+05 0.00 0.00 0.00 0.00

arctan(vz/vx) arctan(vy/vx)

Box encloses 1:3 hole aspect ratio -2

-1.5

-1

-0.5

0

0.5

1

1.5

2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2