222 Gauss n=2.5 244 Gauss n=2.75 267 Gauss n=3 289 Gauss n=3.25 312 Gauss n=3.5

Time (ns)

Electron Density (10^{12} m^{-3})

0

1

2

3

4

5

6

0 20 40 60 80 100 120 140 160 180 200