Incident Polar Angle for 0 Λ ϕ Λ 360 degrees

Entries Mean RMS 500000 45.02 22.74

12/10/17 11.45

Wall Polar Angle (degrees)

Number of Electrons per Degree

0 50 100 150 200 250 300

Azimuth (degrees) tan(θ) (1/3 for 1:3 RFA Port Holes)

0 1000

2000

3000

4000

5000

6000

7000

8000

0 10 20 30 40 50 60 70 80 90

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 50 100 150 200 250 300 350

Incident Polar Angle for 30 Λ ϕ Λ 59 degrees

Entries Mean RMS 25307 25.43 17.80

12/10/17 11.45

Wall Polar Angle (degrees)

Number of Electrons per Degree

0 5 10 15 20 25 30 35 40

Azimuth (degrees) tan(θ) (1/3 for 1:3 RFA Port Holes)

0 100 200 300 400 500 600 700

0 10 20 30 40 50 60 70 80 90

0 0.1 0.2 0.3 0.4 0.5 0.6

30 35 40 45 50 55

Incident Polar Angle for 120 Λ ϕ Λ 149 degrees

Entries Mean RMS 27212 25.18 17.81

12/10/17 11.45

Wall Polar Angle (degrees)

Number of Electrons per Degree

0 10 20 30 40 50

Azimuth (degrees) tan(θ) (1/3 for 1:3 RFA Port Holes)

0 100 200 300 400 500 600 700

0 10 20 30 40 50 60 70 80 90

0 0.1 0.2 0.3 0.4 0.5 0.6

120 125 130 135 140 145

Incident Polar Angle for 210 Λ ϕ Λ 239 degrees

Entries Mean RMS 28289 25.51 17.78

12/10/17 11.45

Wall Polar Angle (degrees)

Number of Electrons per Degree

0 10 20 30 40 50

Azimuth (degrees) tan(θ) (1/3 for 1:3 RFA Port Holes)

0 100 200 300 400 500 600 700 800

0 10 20 30 40 50 60 70 80 90

0 0.1 0.2 0.3 0.4 0.5 0.6

210 215 220 225 230 235

Incident Polar Angle for 300 Λ ϕ Λ 329 degrees

Entries Mean RMS 24690 25.13 17.70

12/10/17 11.45

Wall Polar Angle (degrees)

Number of Electrons per Degree

0 5 10 15 20 25 30 35 40

Azimuth (degrees) tan(θ) (1/3 for 1:3 RFA Port Holes)

0 100 200 300 400 500 600 700

0 10 20 30 40 50 60 70 80 90

0 0.1 0.2 0.3 0.4 0.5 0.6

300 305 310 315 320 325

Incident Angle on Wall at ϕ = 45, 135, 225, 315 degrees

ENTRIES 500000 338. 64.0 0.211E+04 0.418E+05 0.488E+05 0.383E+06 0.337E+04 534. 0.203E+05

12/10/17 11.45

tan(θ)

ENTRIES 500000 424. 76.0 0.201E+04 0.959E+05 0.533E+05 0.324E+06 0.424E+04 508. 0.194E+05

tan(θ)

ENTRIES 500000 0.202E+04 71.0 415. 0.324E+06 0.532E+05 0.961E+05 0.196E+05 522. 0.405E+04

tan(θ)

ENTRIES 500000 0.212E+04 65.0 323. 0.383E+06 0.491E+05 0.414E+05 0.205E+05 456. 0.324E+04

Azimuth (degrees) tan(θ)

0 10 20 30 40

20 30 40 50 60 70

0 10 20 30 40

110 120 130 140 150 160

0 10 20 30 40

200 210 220 230 240 250

0 10 20 30 40

290 300 310 320 330 340