ts0407-positive_x_side_positron: Rate Cutoff Plot (Drifts and Dipoles)

Entries Mean RMS 64657 0.4803 0.6733

09/02/17 13.12

Rate Frequency

Photons per Meter per Beam Particle Cutoff

Rate Fraction Above Cutoff (%)

10%

0 2000

4000

6000

8000

10000

12000

14000

16000

10^{-2} 10^{-1} 1 10

0

20

40

60

80

100

10^{-2} 10^{-1} 1 10