QSPU00: 0 GeV σπεησπ 0 mA/bunch

-1

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8

1

100 150 200 250 300 350 400 450 500

Time (ns)

Collector Signal (V)

ECLOUD job 20 ECLOUD job 21 ECLOUD job 22 ECLOUD job 23 ECLOUD job 24 ECLOUD job 25 ECLOUD job 26 ECLOUD job 27 ECLOUD job 28 ECLOUD job 29 ECLOUD job 30 ECLOUD job 31 ECLOUD job 32

QSPU in Q48W: 5.3 GeV e+ 8 mA/bunch Run 122

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

100 150 200 250 300 350 400 450 500

Time (ns)

Collector Signal (V)

4/17/13 Detector 1

QSPU in Q48W: 5.3 GeV e+ 8 mA/bunch Run 122

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

100 150 200 250 300 350 400 450 500

Time (ns)

Collector Signal (V)

4/17/13 Detector 2

QSPU01: 5.3 GeV e+ 8.1 mA/bunch

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

100 150 200 250 300 350 400 450 500

Time (ns)

Collector Signal (V)

4/17/13 Trace 175 4/17/13 Trace 198 4/17/13 Trace 213 4/17/13 Trace 141 4/17/13 Trace 241

QSPU01: 5.3 GeV e+ 8.1 mA/bunch

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

100 150 200 250 300 350 400 450 500

Time (ns)

Collector Signal (V)

4/17/13 Trace 177 4/17/13 Trace 199 4/17/13 Trace 215 4/17/13 Trace 3 4/17/13 Trace 139 4/17/13 Trace 243

QSPU in Q48W: 5.3 GeV e+ 0.2 mA/bunch Run 59

-0.3

-0.29

-0.28

-0.27

-0.26 x 10^{-2}

100 150 200 250 300 350 400 450 500

Time (ns)

Collector Signal (V)

4/17/13 Detector 1