Job 18604: Primary Photoelectrons

Entries Mean RMS 9997 4.302 0.4799

10/12/01 10.24

Charge-weighted ρ Distribution (cm)

Entries Mean RMS 9997 178.2 166.3

Charge-weighted ϕ Distribution (degrees)

0 200 400 600 800 1000

1200

1400 x 10^4

2 2.5 3 3.5 4 4.5 5

0 1000

2000

3000

4000

5000

6000

7000

8000 x 10^3

-50 0 50 100 150 200 250 300 350 400

Job 18604: Primary Photoelectrons

Entries Mean RMS 8835 -0.1259 8.968

10/12/01 10.24

ϕ_{180} (degrees) dN/dϕ_{180} (1/degree)

Entries Mean RMS 1162 180.9 58.78

ϕ (degrees) dN/dϕ (1/degree)

0 500 1000

1500

2000

2500

3000

3500

-60 -40 -20 0 20 40 60

0 2 4 6 8 10 12 14

75 100 125 150 175 200 225 250 275 300