11/04/20 11.09

-0.02

-0.015

-0.01

-0.005

0

0 20 40 60 80 100 120

Time (ns)

Button Signal (V)

5 mA

11/04/20 11.09

-0.08

-0.06

-0.04

-0.02

0

0 20 40 60 80 100 120

Time (ns)

Button Signal (V)

8 mA