ECLOUD Drift Dipole 4/2007 Positron Beam

ΔQ_X (kHz) ΔQ_Y (kHz)

Time (ns) Time (ns)

4/2007 Electron Beam

-0.2

-0.1 0 0.1 0.2 0.3

0 200 400 600 0 0.2 0.4 0.6 0.8 1

0 200 400 600

-0.15

-0.125

-0.1

-0.075

-0.05

-0.025 0 0.025

0.05

0.075 0.1

0 200 400 600

-0.4

-0.3

-0.2

-0.1 0 0.1

0 200 400 600

POSINST I Drift Dipole 4/2007 Electron Beam

ΔQ_X (kHz) ΔQ_Y (kHz)

Time (ns) Time (ns)

4/2007 Electron Beam

-0.2

-0.1 0 0.1 0.2 0.3

0 200 400 600 0 0.2 0.4 0.6 0.8 1

0 200 400 600

-0.15

-0.125

-0.1

-0.075

-0.05

-0.025 0 0.025

0.05

0.075 0.1

0 200 400 600

-0.4

-0.3

-0.2

-0.1 0 0.1

0 200 400 600