ECLOUD SEY for Peak Yield of 200% and Peak Energy of 310 eV

Incident Electron Energy (eV)

True Secondary Electron Yield per Incident Electron

cos(θ_{inc}) = 0 cos(θ_{inc}) = 0.2 cos(θ_{inc}) = 0.4 cos(θ_{inc}) = 0.6 cos(θ_{inc}) = 0.8 cos(θ_{inc}) = 1 0

0.5

1

1.5

2

2.5

3

3.5

0 50 100 150 200 250 300 350 400 450 500