Bunch current dependence: 5.3 GeV

11/04/21 15.34

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

4/7 Trace 250 15W TiN 1 mA e+ 4/7 Trace 262 15W TiN 2 mA e+ 4/7 Trace 274 15W TiN 4 mA e+ 4/7 Trace 286 15W TiN 6 mA e+ 4/7 Trace 298 15W TiN 8 mA e+ 4/7 Trace 322 15W TiN 10 mA e+

Bunch current dependence: 5.3 GeV

11/04/21 15.34

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

4/7 Trace 250 15E TiN 1 mA e+ 4/7 Trace 262 15E TiN 2 mA e+ 4/7 Trace 274 15E TiN 4 mA e+ 4/7 Trace 286 15E TiN 6 mA e+ 4/7 Trace 298 15E TiN 8 mA e+ 4/7 Trace 322 15E TiN 10 mA e+