-0.5

-0.4

-0.3

-0.2

-0.1

0 20 40 60 80 100 120 140 160 180

Time (ns)

Collector Signal (V)

12/13/12 Grooved Al ECLOUD SEY=1.2

12/13/12 Smooth Al ECLOUD SEY=2.0