ECLOUD L3-1_orig: Secondary Electrons Generated at Wall

08/09/09 17.11

Time (ns)

Number of Lost Macroparticles

Time (ns)

Number of Lost Macroparticles

0 500 1000

1500

2000

2500

3000

3500

4000

4500

-50 0 50 100 150 200 250

0 5 10 15 20 25

0 0.025 0.05 0.075 0.1 0.125 0.15 0.175 0.2 0.225 0.25