ECLOUD L3-1_orig: Secondary Electrons Generated at Wall

08/09/09 17.11

Kinetic Energy (eV)

Fraction of Elastic Secondary Macroparticles

0

0.2

0.4

0.6

0.8

1

0 5 10 15 20 25 30 35 40 45 50