ECLOUD L3-1_orig: Secondary Electrons Generated at Wall

Entries Mean RMS 24339 6.169 4.833

08/09/09 17.11

Secondary Kinetic Energy (eV)

Energy Distribution of True Secondaries (eV^{-1})

0

500

1000

1500

2000

2500

3000

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5 25