ECLOUD L3-1_orig: Secondary Electrons Generated at Wall

Entries Mean RMS 24339 44.73 19.61

08/09/17 12.55

Non-elastics: Production angle relative to perpendicular (degrees)

Number of Macroparticles per Degree

Entries Mean RMS 24339 0.1496 32.37

Non-elastics: Production angle relative to transverse plane (degrees)

Number of Macroparticles per Degree

0 100 200 300 400 500 600 700 800 900

0 10 20 30 40 50 60 70 80 90

0 200 400 600 800 1000

1200

-80 -60 -40 -20 0 20 40 60 80