Solenoid scan: 2.085 GeV 4.1 mA/bunch e- 15E a-C

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

12/20/2010 Trace 361 0 G

ECLOUD job 32629

12/20/2010 Trace 370 12 G

ECLOUD job 32630

12/20/2010 Trace 382 20 G

ECLOUD job 32631

Solenoid scan: 2.085 GeV 3.8 mA/bunch e- 15E a-C

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

12/20/2010 Trace 370 12 G

ECLOUD job 32630

Solenoid scan: 2.085 GeV 4 mA/bunch e- 15E a-C

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

12/20/2010 Trace 370 12 G

ECLOUD job 32790

Solenoid scan: 2.085 GeV 4 mA/bunch e- 15E a-C

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

ECLOUD job 32716 ECLOUD job 32713

12/20/2010 Trace 382 20 G

Solenoid scan: 2.085 GeV 3.8 mA/bunch e- 15E a-C

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

ECLOUD job 32716 ECLOUD job 32713

12/20/2010 Trace 382 20 G

ECLOUD job 32675

Solenoid scan: 2.085 GeV 3.8 mA/bunch e- 15E a-C

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

12/20/2010 Trace 370 12 G

ECLOUD job 32694

12/20/2010 Trace 382 20 G

ECLOUD job 32675

Solenoid scan: 2.085 GeV 3.8 mA/bunch e- 15E a-C

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25

Time (ns)

Button Signal (V)

12/20/2010 Trace 370 12 G

ECLOUD job 32867

12/20/2010 Trace 376 16 G

ECLOUD job 32869

12/20/2010 Trace 382 20 G

ECLOUD job 32857

Solenoid scan: 2.085 GeV 3.8 mA/bunch e- 15E a-C

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

3 4 5 6 7 8 9 10

Time (ns)

Button Signal (V)

12/20/2010 Trace 370 12 G

ECLOUD job 32867

12/20/2010 Trace 376 16 G

ECLOUD job 32869

12/20/2010 Trace 382 20 G

ECLOUD job 32857