Beampipe-averaged Cloud Density (10^{12} m^{-3})

45 Gauss n=0.50562 87 Gauss n=0.977532 89 Gauss n=1 91 Gauss n=1.02248 134 Gauss n=1.50562

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.5

1

1.5

2

2.5

3

3.5

4

0 25 50 75 100 125 150 175 200