Jobs 1632 to 1819: RFA Collector Currents

Collector Current (nA)

Collector 1

Collector Current (nA)

Collector 9

B Field (G)

1000

2000

3000

4000

5000

6000

7000

8000

0 50 100 150 200 250 300 350

2000

4000

6000

8000

10000

12000

14000

0 50 100 150 200 250 300 350