Job 1599: Electron Cloud Charges Lost at Wall

Entries Mean RMS 100000 4.451 0.1865E-02

09/06/19 12.26

Charge-weighted ρ Distribution (cm)

Entries Mean RMS 100000 180.7 102.2

Charge-weighted ϕ Distribution (degrees)

0 1000

2000

3000

4000

5000

6000

7000

8000

9000 x 10^6

4.445 4.45 4.455 4.46 4.465 4.47 4.475

0 1000

2000

3000

4000

5000

6000

7000 x 10^5

-50 0 50 100 150 200 250 300 350 400