TS0407_SEY10_Epk120: Coherent Tune Shifts

Time (ns) Time (ns)

Drift Dipole Weighted Sum 4/2007 Positron Beam

ΔQ_X (kHz) ΔQ_Y (kHz)

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

0 100 200 0 0.2 0.4 0.6 0.8 1

0 100 200