Average electric field (V/m) for 0.02 Λ T Λ 2688.39 ns

Time (ns)

E_X (V/m)

Time (ns)

E_Y (V/m)

0 0.5 1 1.5 2 2.5 3

0 500 1000 1500 2000 2500

-0.02

-0.01 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0 500 1000 1500 2000 2500

Average electric field (V/m) for 0.02 Λ T Λ 2688.39 ns

X (cm)

Y (cm)

X (cm)

Y (cm)

E_X

E_Y

-4 -3 -2

-1 0 1

2 3 4 -4 -2 0 2 4 -1000

-800

-600

-400

-200 0 200

-4 -3 -2

-1 0 1

2 3 4 -4 -2 0 2 4 -400

-300

-200

-100 0 100 200 300 400

Average electric field (V/m) for 0.02 Λ T Λ 2688.39 ns

-1000

-800

-600

-400

-200 0 200

X (cm)

Y (cm)

-400

-300

-200

-100 0 100 200 300 400

X (cm)

Y (cm)

E_X

E_Y

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

Average electric field (V/m) for 0.02 Λ T Λ 2688.39 ns

X (cm)

Y (cm)

X (cm)

Y (cm)

E_X

E_Y

-2 -1.5 -1

-0.5 0 0.5

1 1.5 2 -2 -1 0 1 2 -7.5 -5 -2.5 0 2.5 5 7.5 10 12.5

-2 -1.5 -1

-0.5 0 0.5

1 1.5 2 -2 -1 0 1 2 -10 -7.5 -5 -2.5 0 2.5 5 7.5 10

Average electric field (V/m) for 0.02 Λ T Λ 2688.39 ns

-7.5 -5 -2.5 0 2.5 5 7.5 10 12.5

X (cm)

Y (cm)

-10 -7.5 -5 -2.5 0 2.5 5 7.5 10

X (cm)

Y (cm)

E_X

E_Y

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Average electric field (V/m) for 2562 Λ T Λ 2562 ns

Time (ns)

E_X (V/m)

Time (ns)

E_Y (V/m)

0.6686

0.6688

0.669

0.6692

0.6694

0.6696

0.6698 x 10^{-2}

2560 2561 2562 2563 2564

0.4625

0.4626

0.4627

0.4628

0.4629

0.463

0.4631

0.4632

0.4633 x 10^{-2}

2560 2561 2562 2563 2564

Average electric field (V/m) for 2562 Λ T Λ 2562 ns

X (cm)

Y (cm)

X (cm)

Y (cm)

E_X

E_Y

-4 -3 -2

-1 0 1

2 3 4 -4 -2 0 2 4 -5 -4 -3 -2 -1 0 1

-4 -3 -2

-1 0 1

2 3 4 -4 -2 0 2 4 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Average electric field (V/m) for 2562 Λ T Λ 2562 ns

-5 -4 -3 -2 -1 0 1

X (cm)

Y (cm)

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

X (cm)

Y (cm)

E_X

E_Y

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

Average electric field (V/m) for 2562 Λ T Λ 2562 ns

X (cm)

Y (cm)

X (cm)

Y (cm)

E_X

E_Y

-2 -1.5 -1

-0.5 0 0.5

1 1.5 2 -2 -1 0 1 2 -0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

-2 -1.5 -1

-0.5 0 0.5

1 1.5 2 -2 -1 0 1 2 -0.15

-0.1

-0.05 0 0.05 0.1 0.15

Average electric field (V/m) for 2562 Λ T Λ 2562 ns

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

X (cm)

Y (cm)

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

X (cm)

Y (cm)

E_X

E_Y

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2